INSERT INTO ConfigurationAdmin VALUES ('KeepSessionOnBrowserClose', 'la_Text_Website', 'la_config_KeepSessionOnBrowserClose', 'checkbox', '', '', 10.27, 0, 0);
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'KeepSessionOnBrowserClose', '1', 'In-Portal', 'in-portal:configure_general');

INSERT INTO ConfigurationAdmin VALUES ('RememberLastAdminTemplate', 'la_Text_General', 'la_config_RememberLastAdminTemplate', 'checkbox', '', '', 10.13, 0, 0);
INSERT INTO ConfigurationValues VALUES (DEFAULT, 'RememberLastAdminTemplate', '', 'In-Portal:Users', 'in-portal:configure_users');

UPDATE Modules SET Version = '4.3.1' WHERE Name = 'Core';
UPDATE Modules SET Version = '4.3.1' WHERE Name = 'In-Portal';