Index: trunk/admin/install/inportal_schema.sql
===================================================================
diff -u -r5107 -r5108
--- trunk/admin/install/inportal_schema.sql	(.../inportal_schema.sql)	(revision 5107)
+++ trunk/admin/install/inportal_schema.sql	(.../inportal_schema.sql)	(revision 5108)
@@ -72,7 +72,7 @@
   element_type varchar(20) NOT NULL default '',
   validation varchar(255) default NULL,
   ValueList text default NULL,
-  DisplayOrder double NOT NULL default '0',
+  DisplayOrder int(11) NOT NULL default '0',
   Install int(11) NOT NULL default '1',
   PRIMARY KEY  (VariableName)
 )
